X-Git-Url: https://code.delx.au/gnu-emacs/blobdiff_plain/4382021fc15f8a52c9dd12bacb7c75dbeb562302..e468b87f91f26e66a8cde087c1a9c89c67b96d12:/etc/dired-ref.tex

diff --git a/etc/dired-ref.tex b/etc/dired-ref.tex
index 061c1415ec..45c1e8fc14 100644
--- a/etc/dired-ref.tex
+++ b/etc/dired-ref.tex
@@ -6,7 +6,7 @@
 
 % GNU Emacs is free software; you can redistribute it and/or modify
 % it under the terms of the GNU General Public License as published by
-% the Free Software Foundation; either version 2, or (at your option)
+% the Free Software Foundation; either version 3, or (at your option)
 % any later version.
 
 % GNU Emacs is distributed in the hope that it will be useful,
