X-Git-Url: https://code.delx.au/gnu-emacs/blobdiff_plain/bd358779861f265a7acff31ead40172735af693e..732fd4c7e11debd61c97eaaba3038d61e6ec7024:/etc/refcards/cs-refcard.tex

diff --git a/etc/refcards/cs-refcard.tex b/etc/refcards/cs-refcard.tex
index dad6e7648d..29c8cd1208 100644
--- a/etc/refcards/cs-refcard.tex
+++ b/etc/refcards/cs-refcard.tex
@@ -1,6 +1,6 @@
 % Reference Card for GNU Emacs
 
-% Copyright (C) 1987, 1993, 1996-1997, 2001-2013 Free Software
+% Copyright (C) 1987, 1993, 1996-1997, 2001-2015 Free Software
 % Foundation, Inc.
 
 % Author: Stephen Gildea <gildea@stop.mail-abuse.org>
@@ -49,6 +49,11 @@
 % Czech hyphenation rules applied
 \chyph
 
+% Without this, pdfTeX 3.1415926-2.5-1.40.14 (TeX Live 2013/Debian)
+% aborts with: "! UTF-8 INPUT IS CORRUPTED !
+% May be you are using another input encoding"
+\input utf8off
+
 % This file can be printed with 1, 2, or 3 columns per page.
 % Specify how many you want here.
 \newcount\columnsperpage
